MWdt tontonne total fuel ?JustU ???

Depositin fuel

Total EnergyRelease169 MeV - FP 5 MeV - n 5 MeV - g 12 MeV - FP Decay 8 MeV - b,g Decay ----------- 199 MeVEnergyper

Fission